\begin{table}
\caption{}
\begin{center}
\begin{tabular}{l||r|r|r|r|r|r|r}
 &Branch&Branch&Tree&Tree length&Leakage&Leakage&False\\
 &count&detected&length&detected&count&volume&positive\\
 &&(\%)&(cm)&(\%)&&(mm$^3$)&rate (\%)\\
\hline
Team 1&91.1&43.5&64.6&36.4&2.5&152.3&1.27\\
Team 2&157.8&62.8&122.4&55.9&12.0&563.5&1.96\\
*Team 3&74.2&32.1&51.9&26.9&4.2&430.4&3.63\\
Team 4&186.8&76.5&158.7&73.3&35.5&5138.2&15.56\\
Team 5&150.4&59.8&118.4&54.0&1.9&18.2&0.11\\
*Team 6&77.5&36.7&54.4&31.3&2.3&116.3&0.92\\
Team 7&146.8&57.9&125.2&55.2&6.5&576.6&2.44\\
*Team 8&71.5&30.9&52.0&26.9&0.9&126.8&1.75\\
Team 9&139.0&56.0&100.6&47.1&13.5&368.9&1.58\\
Team 10&79.3&32.4&57.8&28.1&0.4&14.3&0.11\\
*Team 11&93.5&41.7&65.7&34.5&1.9&39.2&0.41\\
Team 12&130.1&53.8&95.8&46.6&5.6&559.0&2.47\\
Team 13&152.1&63.0&122.4&58.4&5.0&372.4&1.44\\
Team 14&161.4&67.2&115.4&57.0&44.1&1873.4&7.27\\
*Team 15&148.7&63.1&119.2&58.9&10.4&158.8&1.19\\
\end{tabular}
\end{center}
\end{table}
